ALTER TABLE `ufutx_ios_version` 
ADD COLUMN `feedback_ids` varchar(255) NULL COMMENT '修改的bug id' AFTER `desc`,
MODIFY COLUMN `status` tinyint(4) NOT NULL DEFAULT 0 COMMENT '状态 0:关闭 1:开启' AFTER `desc`;