CREATE TABLE `health`.`ufutx_s2_i18n` ( `id` BIGINT NOT NULL AUTO_INCREMENT , `keyname` VARCHAR(128) NOT NULL COMMENT '唯一索引' , `intro` VARCHAR(128) NOT NULL COMMENT '简要说明' , `data` TEXT NOT NULL , PRIMARY KEY (`id`), UNIQUE `keyname` (`keyname`)) ENGINE = InnoDB COMMENT = '国际化文本';