CREATE TABLE `health`.`ufutx_s2_depoly_version` ( 
    `id` BIGINT NOT NULL AUTO_INCREMENT , 
    `appname` VARCHAR(512) NOT NULL COMMENT '应用名' , 
    `filepath` VARCHAR(512) NOT NULL COMMENT '文件路径' , 
    `filesize` BIGINT NOT NULL DEFAULT '0' COMMENT '文件尺寸, 单位kb' , 
    `desc` VARCHAR(1024) NOT NULL COMMENT '简要说明' , 
    `duration_total` BIGINT NOT NULL DEFAULT '0' COMMENT '总运行时间' , 
    `duration_curr` BIGINT NOT NULL DEFAULT '0' COMMENT '上线后运行时间' , 
    `status` TINYINT NOT NULL DEFAULT '1' COMMENT '状态,1=闲置, 2=在线' , 
    `user_create` INT NOT NULL COMMENT '创建用户id' , 
    `user_update` INT NOT NULL COMMENT '最后操作用户id' , 
    `created_at` TIMESTAMP NULL DEFAULT NULL , 
    `updated_at` TIMESTAMP NULL DEFAULT NULL , 
    `deleted_at` TIMESTAMP NULL DEFAULT NULL , 
    `online_at` TIMESTAMP NULL DEFAULT NULL , 
    PRIMARY KEY (`id`)
) ENGINE = InnoDB;