CREATE TABLE `ufutx_s2_supplier_admin` (
  `id` bigint(20) UNSIGNED PRIMARY KEY NOT NULL AUTO_INCREMENT,
  `mobile` varchar(64) NOT NULL COMMENT '手机号',
  `pwd` varchar(256) NOT NULL COMMENT '密码(md5)',
  `supplier_ids` varchar(256) NOT NULL COMMENT '可管理供应商id列表,逗号分隔',
  `permission` text COMMENT '权限',
  `created_at` timestamp NULL DEFAULT NULL,
  `updated_at` timestamp NULL DEFAULT NULL
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='供应商后台管理员';