create table if not EXISTS ufutx_test (
    id int(10) unsigned not null auto_increment,
    name varchar(100) not null comment "姓名",
    primary key(id)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci;