ALTER TABLE `ufutx_s2_api_logs` 
ADD COLUMN `ip` varchar(32) NULL COMMENT '客户端请求ip地址' AFTER `cast_time`,
ADD COLUMN `header` text NULL COMMENT '请求头' AFTER `ip`;